-80 -60 -40 -20 0 20 40 60 80 100 120 100

200

300

400

500

600

700

800

900

Corrected elevation

Meander wavelength

Meander wavelength versus corrected elevation

0.2

0.4

0.6

0.8

1

1.2

1.4

1.6

1.8

2 x 10^4