-300

-200

-100 0 100 200 300 400

0 200 400 600 800 1000 1200 1400 Meander wavelength (m)

Stratigraphicelevation(m)

20 43 81 56 1

8 3

13 20 60 44 11 3 1 1 3 1

-300

-200

-100 0 100 200 300 400 0 20 40 60 80 100 120 140

Channel width (m)