1.32 1.325 1.33 1.335 1.34 1.345 1.35 1.355 1.36 1.365 1.37

x 10^4

2000

2050

2100

2150

2200

2250

2300

149 177160

Centerlines Picked 3 Times, Then Uniformly Interpolated; Results Smoothed; then Half-Meanders IDd using Inflection Points Half-Meanders with Sinuosity <1.1 not measured (red). Channel Centerline ID:8

distance x (m) distance y (m)

-2104

-2102

-2100

-2098

-2096

-2094

-2092