2600 2620 2640 2660 2680 2700 2720 2740 2760 2780 2800

2060

2080

2100

2120

2140

2160

2180

5162 60

72

Centerlines Picked 3 Times, Then Uniformly Interpolated; Results Smoothed; then Half-Meanders IDd using Inflection Points Half-Meanders with Sinuosity <1.1 not measured (red). Channel Centerline ID:57

distance x (m) distance y (m)

-2188.8

-2188.6

-2188.4

-2188.2

-2188

-2187.8

-2187.6

-2187.4

-2187.2

-2187