1900 1950 2000 2050 2100 2150 2200 2250 2300 2350

1850

1900

1950

2000

2050

2100

2150 78

63

61 53

79

62 5158

63

63

79

Centerlines Picked 3 Times, Then Uniformly Interpolated; Results Smoothed; then Half-Meanders IDd using Inflection Points Half-Meanders with Sinuosity <1.1 not measured (red). Channel Centerline ID:56

distance x (m) distance y (m)

-2193

-2192

-2191

-2190

-2189

-2188

-2187