1750 1800 1850 1900 1950 2000 2050 2100 2150 2200

2650

2700

2750

2800

2850

2900

2950

98

173

179

106

166

167

97

149

189

Centerlines Picked 3 Times, Then Uniformly Interpolated; Results Smoothed; then Half-Meanders IDd using Inflection Points Half-Meanders with Sinuosity <1.1 not measured (red). Channel Centerline ID:54

distance x (m) distance y (m)

-2202

-2201

-2200

-2199

-2198

-2197

-2196

-2195

-2194