3200 3300 3400 3500 3600 3700 3800

1.43

1.435

1.44

1.445

1.45

1.455

1.46

1.465

1.47

1.475 x 10^4

159158 165

Centerlines Picked 3 Times, Then Uniformly Interpolated; Results Smoothed; then Half-Meanders IDd using Inflection Points Half-Meanders with Sinuosity <1.1 not measured (red). Channel Centerline ID:36

distance x (m) distance y (m)

-2366

-2365.5

-2365

-2364.5

-2364

-2363.5

-2363

-2362.5

-2362

-2361.5

-2361