2700 2800 2900 3000 3100 3200 3300

1.535

1.54

1.545

1.55

1.555

1.56

1.565

1.57

1.575

1.58 x 10^4

221 207 222

Centerlines Picked 3 Times, Then Uniformly Interpolated; Results Smoothed; then Half-Meanders IDd using Inflection Points Half-Meanders with Sinuosity <1.1 not measured (red). Channel Centerline ID:34

distance x (m) distance y (m)

-2386

-2384

-2382

-2380

-2378

-2376

-2374