1.555 1.56 1.565 1.57 1.575 1.58 1.585

x 10^4

2

2.005

2.01

2.015

2.02 x 10^4

104 126 101

Centerlines Picked 3 Times, Then Uniformly Interpolated; Results Smoothed; then Half-Meanders IDd using Inflection Points Half-Meanders with Sinuosity <1.1 not measured (red). Channel Centerline ID:31

distance x (m) distance y (m)

-2120

-2119

-2118

-2117

-2116

-2115

-2114

-2113

-2112

-2111