1.585 1.59 1.595 1.6 1.605 1.61 1.615

x 10^4

1.765

1.77

1.775

1.78

1.785 x 10^4

91

136

86

131

93

116

Centerlines Picked 3 Times, Then Uniformly Interpolated; Results Smoothed; then Half-Meanders IDd using Inflection Points Half-Meanders with Sinuosity <1.1 not measured (red). Channel Centerline ID:30

distance x (m) distance y (m)

-2232

-2230

-2228

-2226

-2224

-2222

-2220

-2218

-2216