1.54 1.55 1.56 1.57 1.58 1.59 1.6 1.61 1.62

x 10^4

1.59

1.6

1.61

1.62

1.63

1.64 x 10^4

171

238

240

225

245

227

Centerlines Picked 3 Times, Then Uniformly Interpolated; Results Smoothed; then Half-Meanders IDd using Inflection Points Half-Meanders with Sinuosity <1.1 not measured (red). Channel Centerline ID:29

distance x (m) distance y (m)

-2225

-2220

-2215

-2210

-2205

-2200

-2195