1.56 1.58 1.6 1.62 1.64 1.66 x 10^4

1.62

1.63

1.64

1.65

1.66

1.67

1.68

1.69

1.7 x 10^4

221 278 173 180

271

162 152 253

222

203 254

Centerlines Picked 3 Times, Then Uniformly Interpolated; Results Smoothed; then Half-Meanders IDd using Inflection Points Half-Meanders with Sinuosity <1.1 not measured (red). Channel Centerline ID:28

distance x (m) distance y (m)

-2220

-2215

-2210

-2205