1.525 1.53 1.535 1.54 1.545 1.55

x 10^4

1.388

1.39

1.392

1.394

1.396

1.398 1.4 1.402

1.404

1.406

1.408 x 10^4

Centerlines Picked 3 Times, Then Uniformly Interpolated; Results Smoothed; then Half-Meanders IDd using Inflection Points Half-Meanders with Sinuosity <1.1 not measured (red). Channel Centerline ID:26

distance x (m) distance y (m)

-2172.5

-2172

-2171.5

-2171

-2170.5

-2170

-2169.5

-2169

-2168.5

-2168

-2167.5