1.275 1.28 1.285 1.29 1.295 1.3 1.305 1.31 1.315

x 10^4

1.165

1.17

1.175

1.18

1.185

1.19

1.195 x 10^4

141 133

Centerlines Picked 3 Times, Then Uniformly Interpolated; Results Smoothed; then Half-Meanders IDd using Inflection Points Half-Meanders with Sinuosity <1.1 not measured (red). Channel Centerline ID:18

distance x (m) distance y (m)

-2216

-2214

-2212

-2210

-2208

-2206

-2204

-2202

-2200

-2198

-2196